Table III Abbreviations used in detailed listings

Journals A&A Astronomy & Astrophysics A&AS Astronomy & Astrophysics Supplement AJ Astronomical Journal AuJPh Australian Journal of Physics AuJPA Australian Journal of Physics Astrophysical Supplement ApL Astrophysical Letters ApJ Astrophysical Journal ApJS Astrophysical Journal Supplement AR Astronomy Reports (Astronomicheskiĭ Zhurnal translation) AZh Astronomicheskiĭ Zhurnal JA&A Journal of Astrophysics & Astronomy JRASC Journal of the Royal Astronomical Society of Canada MNRAS Monthly Notices of the Royal Astronomical Society Nat Nature PASAu Proceedings of the Astronomical Society of Australia PASJ Publications of the Astronomical Society of Japan PASP Publications of the Astronomical Society of the Pacific RMxAA Review of Mexican Astronomy & Astrophysics SvA Soviet Astronomy SvAL Soviet Astronomy Letters Sci Science Proceedings IAU101 is Supernova Remnants and their X-ray Emission, (IAU Symposium 101), eds Danziger, I.J. & Gorenstein, P., (Reidel, Dordrecht, Holland), 1983.

SNRISM is Supernova Remnants and the Interstellar Medium, (IAU Colloquium 101), eds Roger, R.S. & Landecker, T.L., (Cambridge University Press), 1988.

Telescopes: Radio 5km Cambridge 5-km Telescope 6C Cambridge low frequency northern survey ATCA Australia Telescope Compact Array CLFST Cambridge Low Frequency Synthesis Telescope DRAO Dominion Radio Astrophysical Observatory FIRST Fleurs Synthesis Telescope HMT Cambridge Half-Mile Telescope MOST Molonglo Observatory Synthesis Telescope NRAO National Radio Astronomy Observatory NRO Nobeyama Radio Observatory OMT Cambridge One-Mile Telescope OSRT Ooty Synthesis Radio Telescope TPT Clark Lake TPT telescope VLA Very Large Array VRO Vermillion River Observatory WSRT Westerbork Synthesis Radio Telescope Telescopes: X-ray EXOSAT European X-ray Observatory Satellite ROSAT Röntgensatellit ASCA Advacned Satellite for Cosmology and Asttrophysics On board Einstein (HEAO-2) FPCS Focal Plane Crystal Spectrometer HRI High Resolution Imager IPC Imaging Proportional Counter SSS Solid State Spectrometer

Version VI: 1996 August